en	enabled

en	disabled

en	Base-Settings

en	Template Scheme: Enter the key of the template scheme for things like logo, colors etc.

en	Main Menu Entry Point: Enter the page ID that will be used to generate the main menu from.

en	Homepage: Enter the page ID that will be used to link back to home (e.g. logo).

en	Quicklinks-Menu Folder: Enter the page ID of the folder that contains all pages of the quicklinks menu.

en	Imprint-Menü Folder: Enter the page ID of the folder that contains all pages of the imprint menu.

en	Footer Donation Banner: Enter the page ID of the page that contains the content for the global footer donation banner.

en	Footer-Menu Column 1: Enter the page ID of the folder that contains all pages of the footer menu in column 1.

en	Footer-Menu Column 2: Enter the page ID of the folder that contains all pages of the footer menu in column 2.

en	Footer-Menu Column 3: Enter the page ID of the folder that contains all pages of the footer menu in column 3.

en	Footer-Menu Column 4: Enter the page ID of the folder that contains all pages of the footer menu in column 4.

en	Footer-Menu Column 5: Enter the page ID of the folder that contains all pages of the footer menu in column 5.

en	Footer-Menu Column 6: Enter the page ID of the folder that contains all pages of the footer menu in column 6.

en	Toolbar donation button target page: Enter the page ID that will be used to link to the donation button in the toolbar.

en	Global Contact Options

en	Phone number: Phone number for clickable phone icons (without spaces)

en	Global e-mail: Global e-mail address e.g. for a clickable email icon

en	Google Maps: Google Maps link for a clickable Google-Maps icon

en	Facebook: Link to Facebook

en	Twitter: Link to Twitter

en	Instagram: Link to Instagram

en	LinkedIn: Link to LinkedIn

en	Xing: Link to Xing

en	YouTube: Link to YouTube

en	Performance and debug settings

en	Javascript Compression

en	Javascript Concatenation

en	CSS Compression

en	CSS Concatenation

en	TYPO3 Caching: Disable only for development!

en	Fluid / Extbase Debugging: If disabled, when an error occurs, the entire page is not displayed as an error, but an error message is displayed for the part of the page that is affected. (Oops an error occurred.)