en	A dashboard with all available widgets for search.

en	ke_search

en	ke_search

en	Indexer Status

en	Shows the current status of the ke_search indexer.

en	Indexer is running since

en	Currently no indexing process is running

en	h

en	m

en	s

en	Last run finished

en	at

en	and took

en	Index Overview

en	Number of records

en	Shows how many records of each type are currently in the index.

en	Trending search phrases

en	Shows search phrases from the last 7 days.

en	Search phrase

en	Number of usages

en	Language

en	No template paths set. Did you include the static template?